<script>
	import {
		getInspectionManage
	} from '@/api/inspection/inspectionManage.js'
	export default {
		created() {
			this.requestCameraAuth()
		},
		methods: {
			requestCameraAuth() {
				const _this = this
				uni.authorize({
					scope: 'scope.camera', // 请求相机权限  
					success: (res) => {
						_this.scanQRCode();
					},
					fail: (err) => {
						// 用户拒绝授权
						uni.showToast({
							title: '您拒绝了授权',
							icon: 'none'
						});
					}
				});
			},
			scanQRCode() {
				const _this = this
				uni.scanCode({
					onlyFromCamera: true,
					scanType: ['qrCode'],
					success(res) {
						if (res.result) {
							// 扫描成功，处理二维码内容
							getInspectionManage(res.result).then(res => {
								if (res.data.inspectionStatus === "1") {
									let inspectionPoint = res.data.inspectionPoint
									let inspectionRequirements = res.data.inspectionRequirements
									// _this.$tab.redirectTo(
									// 	`/pages/work/inspection/scanSign/index?inspectionPoint=${inspectionPoint}&inspectionRequirements=${inspectionRequirements}`
									// 	)
									uni.reLaunch({
										url: `/pages/work/inspection/scanSign/index?inspectionPoint=${inspectionPoint}&inspectionRequirements=${inspectionRequirements}`
									})
								} else {
									uni.reLaunch({
										url: '/pages/work/index'
									}).then(()=>{
										// 扫描失败
										uni.showToast({
											title: '验证码已失效！！！',
											icon: 'none'
										});
									})
								}
							});

						} else {
							// 扫描失败
							uni.showToast({
								title: '扫描失败',
								icon: 'none'
							});
						}
					},
					fail(res) {
						uni.showToast({
							title: '调用相机失败',
							icon: 'none'
						});

					}
				});
			}
		}
	}
</script>

<style>
</style>